DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-036 arXiv:1607.04465 July 2016

The Mathematica Package TopoID and its Application to the Higgs Boson Production Cross Section

J. Hoff

Deutsches Elektronen-Synchrotron DESY, Zeuthen

ISSN 0418-9833

PLATANENALLEE 6 - 15738 ZEUTHEN