DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-040 TCDMATH 16-02 arXiv:1603.00046 March 2016

The Chirally Rotated Schrödinger Functional: Theoretical Expectations and Perturbative Tests

M. Dalla Brida

John von Neumann-Institut für Computing NIC/DESY, Zeuthen

S. Sint

School of Mathematics, Trinity College Dublin, Ireland

P. Vilaseca

Istituto Nazionale di Fisica Nucleare, Sezione di Roma, Italy

ISSN 0418-9833

PLATANENALLEE 6 - 15738 ZEUTHEN