DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-054 arXiv:1604.02029 July 2016

Deciphering the CP Nature of the 750 GeV Resonance

M. Chala

Deutsches Elektronen-Synchrotron DESY, Hamburg

C. Grojean

Deutsches Elektronen-Synchrotron DESY, Hamburg and ICREA, Catalan Institution for Research and Advanced Studies, Barcelona, Spain

M. Riembaum, T. Vantalon

Deutsches Elektronen-Synchrotron DESY, Hamburg and IFAE, Barcelona Institute of Science and Technology (BIST), Bellaterra, Spain

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG