DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16–057 CoEPP-MN-16-20 KIAS-Q16008 arXiv:1609.00371 September 2016

Precise Higgs Mass Calculations in (Non-)Minimal Supersymmetry at Both High and Low Scales

P. Athron

ARC Centre of Excellence for Particle Physics at the Terascale, School of Physics and Astronomy, Monash University, Australia

J. Park

Quantum Universe Center, Korea Institute for Advanced Study, Seoul, Korea

T. Steudtner, D. Stöckinger

Institut für Kern- und Teilchenphysik, Technische Universität Dresden

A. Voigt

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG