DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-060 arXiv:1604.04611 April 2016

FormCalc 9 and Extensions

T. Hahn

Max-Planck-Institut für Physik, München

S. Paßehr

Deutsches Elektronen-Synchrotron DESY, Hamburg

C. Schappacher

KIT Institut für Theoretische Physik, Karlsruhe

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG