DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-069 arXiv:1604.05326 June 2016

Plateau Inflation from Random Non-Minimal Coupling

B. J. Broy

Deutsches Elektronen-Synchrotron DESY, Hamburg

D. Coone

Van Swinderen Institute for Particle Physics and Gravity, University of Groningen, The Netherlands and Theoretische Natuurkunde, Vrije Universiteit Brussel, The International Solvay Institutes, Brussel, Belgium

D. Roest

Van Swinderen Institute for Particle Physics and Gravity University of Groningen, The Netherlands

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG