DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16–076 OUTP-16-08P CAVENDISH-HEP-16-06 arXiv:1605.01733 May 2016

Matched Predictions for the bb̄H Cross Section at the 13 TeV LHC

M. Bonvini

Rudolf Peierls Centre for Theoretical Physics, University of Oxford, UK

A. S. Papanastasiou

Cavendish Laboratory, University of Cambridge, UK

F. J. Tackmann

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG