DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-091 arXiv:1605.05845 May 2016

Summing Threshold Logs in a Parton Shower

Z. Nagy

Deutsches Elektronen-Synchrotron DESY, Hamburg

D. E. Soper

Institute of Theoretical Science, University of Oregon, Eugene, USA

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG