DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-100 arXiv:1606.02771 June 2016

The Effective Bootstrap

A. Castedo Echeverri

SISSA and INFN, Trieste, Italy

B. von Harling

Deutsches Elektronen-Synchrotron DESY, Hamburg

M. Serone

SISSA and INFN, Trieste, Italy and ICTP, Trieste, Italy

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG