DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-101 arXiv:1611.09868 November 2016

Exploring the Nearly Degenerate Stop Region with Sbottom Decays

H. An

Walter Burke Institute for Theoretical Physics, California Institute of Technology, Pasadena, USA

J. Gu

Center for Future High Energy Physics, Institute of High Energy Physics, Chinese Academy of Sciences, Beijing, China and Deutsches Elektronen-Synchrotron DESY, Hamburg

L.-T. Wang

Enrico Fermi Institute and Department of Physics, University of Chicago, USA and Kavli Institute for Cosmologie Physics, University of Chicago, USA

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG