DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-103 arXiv:1607.01395 July 2016

α^′ Inflation: Moduli Stabilisation and Observable Tensors from Higher Derivatives

M. Cicoli

Dipartimento di Fisica ed Astronomia, Università di Bologna and INFN, sezione di Bologna, Italy and Abdus Salam ICTP, Trieste, Italy

D. Ciupke

Deutsches Elektronen-Synchrotron DESY, Hamburg

S. de Alwis

Department of Physics, University of Colorado, Boulder, USA

F. Muia

INFN, sezione di Bologna, Italy

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG