DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-112 arXiv:1607.02187 July 2016

Cosmological Constraints on Dark Matter Annihilation and Decay:

Cross-Correlation Analysis of the Extragalactic γ-Ray Background and Cosmic Shear

M. Shirasaki

National Astronomical Observatory of Japan, Mitaka, Tokyo, Japan

O. Macias, S. Horiuchi

Center for Neutrino Physics, Department of Physics, Virginia Tech, Blacksburg, Virginia, USA

S. Shirai

Deutsches Elektronen-Synchrotron DESY, Hamburg

N. Yoshida

Department of Physics, University of Tokyo, Japan and Kavli Institute for the Physics and Mathematics of the Universe (WPI), University of Tokyo, Kashiwa, Chiba, Japan and CREST, Japan Science and Technology Agency, Kawaguchi, Saitama, Japan

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG