DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-113 arXiv:1606.07609 June 2016

How to Save the WIMP: Global Analysis of a Dark Matter Model with Two s-Channel Mediators

M. Duerr, F. Kahlhoefer, K. Schmidt-Hoberg

Deutsches Elektronen-Synchrotron DESY, Hamburg

T. Schwetz, S. Vogl

Institut für Theoretische Physik, Karlsruher Institut für Technologie (KIT), Karlsruhe

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG