DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16–130 arXiv:1608.05212 August 2016

Determination of the Top-Quark Mass from Hadro-Production of Single Top-Quarks

S. Alekhin

II. Institut für Theoretische Physik, Universität Hamburg and Institute for High Energy Physics, Protvino, Moscow Region, Russia

S. Moch, S. Thier

II. Institut für Theoretische Physik, Universität Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG