DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-136 arXiv:1607.07880 November 2016

Perspectives for Tests of Neutrino Mass Generation at the GeV Scale:

Experimental Reach versus Theoretical Predictions

R. W. Rasmussen, W. Winter

Deutsches Elektronen-Synchrotron DESY, Zeuthen

ISSN 0418-9833

PLATANENALLEE 6 - 15738 ZEUTHEN