DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16–146 KA-TP-24-2016 ZU-TH 27/16 arXiv:1608.02949 August 2016

Distributions for Neutral Higgs Production in the NMSSM

S. Liebler

Deutsches Elektronen-Synchrotron DESY, Hamburg

H. Mantler

Institute for Theoretical Physics, Karlsruhe Institute for Technology, Karlsruhe and Institute for Nuclear Physics, Karlsruhe Institute for Technology, Eggenstein-Leopoldshafen

M. Wiesemann

Physik-Institut, Universität Zürich, Zürich, Switzerland

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG