DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16–161 CERN-TH-2016-187 arXiv:1608.06765 August 2016

Gauge-Independent Scales Related to the Standard Model Vacuum Instability

J. R. Espinosa

Dept. de Física and Institut de Física D’Altes Energies, IFAE, The Barcelona Institute of Science and Technology, BIST, Campus UAB, Bellaterra, Spain and ICREA, Barcelona, Spain

M. Garny

CERN, Geneva, Switzerland

T. Konstandin

Deutsches Elektronen-Synchrotron DESY, Hamburg

A. Riotto

Department of Theoretical Physics and Center for Astroparticle Physics, CAP, Geneva, Switzerland

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG