DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-168 arXiv:1608.08108 August 2016

Empirical Optimization of Undulator Tapering at FLASH2 and Comparison with Numerical Simulations

A. Mak, F. Curbis, S. Werin

MAX IV Laboratory, University of Lund, Sweden

B. Faatz

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG