DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16–171 arXiv:1609.00379 September 2016

Numerical Evaluation of the Bispectrum in Multiple Field Inflation

M. Dias

Deutsches Elektronen-Synchrotron DESY, Hamburg and Astronomy Centre, University of Sussex, Brighton, UK

J. Frazer

Deutsches Elektronen-Synchrotron DESY, Hamburg and Department of Theoretical Physics, University of the Basque Country, UPV/EHU Bilbao, Spain and IKERBASQUE, Basque Foundation for Science, Bilbao, Spain

D. J. Mulryne

School of Physics and Astronomy, Queen Mary University of London, UK

D. Seery

Astronomy Centre, University of Sussex, Brighton, UK

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG