DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-182 arXiv:1610.06193 October 2016

Breit-Wigner Approximation for Propagators of Mixed Unstable States

E. Fuchs

Department of Particle Physics and Astrophysics, Weizmann Institute for Science, Rehovot, Israel

G. Weiglein

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG