DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16–218 arXiv:1611.06114 November 2016

Investigations into the Impact of Bond Pads and p-Stop Implants on the Detection Efficiency of Silicon Micro-Strip Sensors

L. Poley et. al.

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG