DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-239 NORDITA-2016-123 WIS/07/16-DEC-DPPA arXix:1612.02479 December 2016

Harmony of Spinning Conformal Blocks

V. Schomerus

Deutsches Elektronen-Synchrotron DESY, Hamburg

E. Sobko

Nordita and Stockholm University, Stockholm, Sweden

M. Isachenkov

Department of Particle Physics and Astrophysics, Weizmann Institute of Science, Rehovot, Israel

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG