DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 17-002 arXiv:1701.04830 January 2017

Revisiting the Dilatation Operator of the Wilson-Fisher Fixed Point

P. Liendo

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG