DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 17–015 arXiv:1701.08553 January 2017

The Photon PDF from High-Mass Drell Yan Data at the LHC

F. Giuli

University of Oxford, UK and the

xFitter Developers’ Team

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG