DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 17-032 arXiv:1702.07331 February 2017

Two-Loop Master Integrals for the Leading QCD Corrections to the Higgs Coupling to a W Pair and to the Triple Gauge Couplings ZW W and γ^∗W W

S. Di Vita

Deutsches Elektronen-Synchrotron DESY, Hamburg

P. Mastrolia, A. Primo

Dipartimento di Fisica et Astronomia, Università di Padova and INFN, Sezione di Padova, Italy

U. Schubert

High Energy Physics Division, Argonne National Laboratory, Argonne, USA

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG