DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 17-042 KA-TP-11-2017 arXiv:1703.09237 April 2017

Generic Calculation of Two-Body Partial Decay Widths at the Full One-Loop Level

M. D. Goodsell

Sorbonne Universités, UPMC Univ Paris 06, Paris, France and CNRS, UMR 7589, LPTHE, Paris, France

S. Liebler

Deutsches Elektronen-Synchrotron DESY, Hamburg

F. Staub

Institut für Theoretische Physik (ITP), Karlsruher Institut für Technologie, Karlsruhe and Institut für Kernphysik (IKP), Karlsruher Institut für Technologie, Eggenstein-Leopoldshafen

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG