DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 17-044 arXiv:1704.01953 April 2017

A Global View on the Higgs Self-Coupling

S. Di Vita

Deutsches Elektronen-Synchrotron DESY, Hamburg

C. Grojean

Deutsches Elektronen-Synchrotron DESY, Hamburg and Institut für Physik, Humboldt-Universität, Berlin

G. Panico

IFAE, Institute of Science and Technology BIST, Barcelona

M. Riembau, T. Vantalon

Deutsches Elektronen-Synchrotron DESY, Hamburg and IFAE, Institute of Science and Technology BIST, Barcelona

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG