DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 17-135 arXiv:1609.06503 September 2017

Analysis of the Cool Down Related Cavity Performance of the European XFEL Vertical Acceptance Tests

M. Wenskat, J. Schaffran

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG