)^2

(GeV/c Hm 155 160 165 170 175 180 185 190 195 200

1-CLs

0.7 0.8 0.9 1 1.1 1-CLs Observed 1-CLs Expected σ1-± Expected σ2-± Expected

95% C.L. 90% C.L.