|η| 0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8

0.5 (GeV)

≤ _T

0.1 < p

1.0 (GeV)

≤ _T

0.5 < p

ATLAS