0 0.02

0.04

0.06

50 100 150 200 250

r_{tot}^{diff}

ZEUS

Q^2 = 2.7 GeV^2 Q^2 = 4 GeV^2 Q^2 = 6 GeV^2 Q^2 = 8 GeV^2 Q^2 = 14 GeV^2 Q^2 = 27 GeV^2 Q^2 = 55 GeV^2

0.28 < M_X < 2 GeV

0 0.02

0.04

0.06

50 100 150 200 250

8 < M_X < 15 GeV

ZEUS 98-99

0 0.02

0.04

0.06

50 100 150 200 250

2 < M_X < 4 GeV

0 0.02

0.04

0.06

50 100 150 200 250

15 < M_X < 25 GeV

0 0.02

0.04

0.06

50 100 150 200 250

4 < M_X < 8 GeV

0 0.02

0.04

0.06

50 100 150 200 250

W(GeV)

25 < M_X < 35 GeV