XY View ZR View

Zeus Run 37681 Event 29486 date: 22-08-2000 time: 16:21:35

ZeVis

E= 33.55 GeV = 11.90 GeV tE = 56.70 GeV z E-p = 0.00 GeV fE = 6.36 GeV bE = 27.19 GeV rE = 1.88 GeV tp = 1.88 GeV xp = 0.01 GeV yp =-23.16 GeV zp phi= 0.00 =-100.00 ns ft = -0.66 ns bt = 0.14 ns rt = -0.05 ns gt