)^2

(GeV 2 ρ + M 2Q 1 10

)^{-2} (GeV DB

2 3 4 5 6 7 8 9 10 11 12 pρ→*p γ

)^2

(W = 75 GeV, |t| < 0.5 GeV

H1 95-96

γ