Bjx

) / ND ξΔ Ratio ( SD /

10^{-3}

10^{-2}

10^{-1}

1

10 / ndf

2χ 23.26 / 12

Prob 0.0256

Const 0.0009656 ± 0.01031

slope 0.04422 ± 1.027

±

±

10^{-3} 10^{-2} 10^{-1}

6% (slope) ± 20% (norm), ± overall syst. uncertainty: )/2 jet2 T+E jet1 T >=(E * T , <E

2>^*_T <E ≡ ^2Q

<0.09 p CAL ξ 0.03<

CDF Run II Preliminary 2 100 GeV

≈^2Q 2 400 GeV

≈^2Q 2 1,600 GeV

≈^2Q 2 3,000 GeV

≈^2Q 2 6,000 GeV

≈^2Q 2 10,000 GeV

≈^2Q