track multiplicity

0 10 20 30 40 50 60 70 80 90 100

Density

-5 10

-4 10

-3 10

-2 10

-1 10 νμ→ POMWIG SD W νμ → PYTHIA Inclusive W

CMS preliminary

| < 2.0 η| > 0.9 GeV Tp