10^{-2}

10^{-1}

0 5 10 15 20 25 30 p_χ(hard system) ΜGeVΝ

1/σ dσ/dp_χ

Transverse Momentum of Z/γ* Μ66 < M_{Z/γ*}/GeV < 116Ν (peak)

Tevatron 1800 GeV Drell-Yan

CDF data Perugia 0 Pro-pT0 Pro-Q20 DW(T)-Pro A

Pythia 6.420 Data from CDF Collaboration, PRL84(2000)845