10^{-3}

10^{-2}

10^{-1}

0 10 20 30 40 50 p_χ(hard system) ΜGeVΝ

1/σ dσ/dp_χ

Transverse Momentum of Z/γ* Μ66 < M_{Z/γ*}/GeV < 116Ν (peak)

LHC 14 TeV Drell-Yan

Perugia 0 Perugia HARD Perugia SOFT Perugia 3

Pythia 6.420