-4 -2 0 2 4

200

400

600

800

1000

1200

1400

1600 ηd ch dN

η

=200 GeV NNs Au-Au 0-6%, =130 GeV NNs Au-Au 0-6%,

=5.5 TeV NNs Pb-Pb