DEUTSCHES ELEKTRONEN-SYNCHROTRON

in der HELMHOLTZ-GEMEINSCHAFT

DESY-THESIS-2007-024 July 2007

Development of a Finite State Machine for the Automated Operation of the LLRF Control at FLASH

by

A. Brandt

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG