DEUTSCHES ELEKTRONEN-SYNCHROTRON

in der HELMHOLTZ-GEMEINSCHAFT

DESY-THESIS-2008-005 February 2008

Commissioning of the Recoil Silicon Detector for the HERMES Experiment

by

N. C. Pickert

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG