DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2009-001 HD-KIP-09-01 January 2009

Measurement of the D^{∗±} Meson Cross Section and Extraction of the Charm Contribution, F^c_2 (x, Q^2), to the Proton Structure in Deep Inelastic ep Scattering with the H1 Detector at HERA

by

A. W. Jung

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG