DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2009-004 January 2009

Study of the Neutralino Sector and Analysis of the Muon Response of a Highly Granular Hadron Calorimeter at the International Linear Collider

by

N. D’Ascenzo

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG