DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2010-007 February 2010

Precise and Fast Beam Energy Measurement at the International Linear Collider

by

M. Viti

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG