DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2010-027 July 2010

Experimental Investigations on the Influence of the Photocathode Laser Pulse Parameters on the Electron Bunch Quality in an RF – Photoelectron Source

by

M. Hänel

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 Hamburg