DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2010-031 August 2010

Towards Diffractive Imaging with Single Pulses of FEL Radiation: Dynamics within Irradiated Samples and their Influence on the Analysis of Imaging Data

by

F. Wang

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 Hamburg