DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2011-029 September 2011

Tests of the Electroweak Standard Model and Measurement of the Weak Mixing Angle with the ATLAS Detector

by

M. Goebel

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG