DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2011-040 November 2011

Measurement of the Energy Flow at Large Pseudorapidities for √ s = 0.9 TeV and √ s = 7 TeV at the Large Hadron Collider Using the Compact Muon Solenoid

by

N. Sen

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG