DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2011-042 HD-KIP-11-68 December 2011

Simulation and Calibration of the Specific Energy Loss of the Central Jet Chambers of the H1 Detector and Measurement of the Inclusive D^{∗±} Meson Cross Section in Photoproduction at HERA

by

E. Hennekemper

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG