DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2011-045 December 2011

Physics Background in Luminosity Measurement at ILC and Measurement of the Proton b-Content at H1 Using Multivariate Method

by

M. Pandurović

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG