DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2012-019 June 2012

Investigation of Slice Emittance Using an Energy-Chirped Electron Beam in a Dispersive Section for Photo Injector Characterization at PITZ

by

Y. Ivanisenko

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG